<p class="mb-0 ng-tns-c655570293-217 ng-trigger ng-trigger-enterAnimation ng-star-inserted">C&aacute;mara de aire MICHELIN Airstop Protecci&oacute;n y fiabilidad .</p>
<div class="ng-tns-c655570293-217 ng-trigger ng-trigger-enterAnimation ng-star-inserted">
<ul>
<li>Presi&oacute;n recomendada: 2,8 ; Presi&oacute;n m&aacute;xima: 3,8 BAR.</li>
<li>Peso: 670gr.</li>
<li>ETRTO:&nbsp;33-46/340-349</li>
</ul>
</div>